Gold: Uses of U.S. Official Holdings

Gold: Uses of U.S. Official Holdings

Gold: Uses of U.S. Official Holdings
April 22, 2012
Congressional Research Service
https://crsreports.congress.gov
RS21204

Gold: Uses of U.S. Official Holdings

Summary
For centuries nations have accumulated gold as a symbol of wealth and power. Gold was once
also of practical value as a medium of exchange and until recent times provided a commodity
backing to most paper currency. Recent decades have seen a steady erosion of gold’s economic
significance. Nevertheless, the U.S. government continues to hold a sizable stock of gold. What is
this stock used for? Although there continues to be some confusion about the role of government
agencies and other institutions with relation to the gold stock, gold is little used. The U.S. Mint,
the principal custodian of the government’s gold holdings, engages in minor gold transactions
associated with producing and selling commemorative coins. The Federal Reserve Bank does not
own or have market transactions in gold, but it does facilitate the “monetization” of U.S. gold
holdings, through its gold certificate account. The Exchange Stabilization Fund, an agency of the
Treasury Department, no longer undertakes actions that use gold, and gold is not used as the basis
of the Treasury’s Special Drawing Rights. The “gold standard” that established a gold backing for
the dollar ceased for domestic purposes in the 1930s and for international purposes in the 1970s.
The continued willingness of the U.S. government to hold a large underutilized stock of gold is,
perhaps, best understood as a hedge against times of severe economic crisis when paper assets
could be useless. This report will not be updated.
Congressional Research Service

Gold: Uses of U.S. Official Holdings

Introduction
In early 2002 the U.S. government owned nearly 262 million fine troy ounces of gold.1 That is
about half the size of the stock held in the early post-war years. Steady reductions through the
1950s and 1960s brought the gold stock to its current size by the early 1970s. There has been
little change in the size of U.S. gold holdings since that time. The U.S. has the largest public
holdings of gold, more than double the holdings of Germany and the International Monetary Fund
(IMF), who have the second and third largest official gold holdings respectively.
The U.S. gold stock is managed by the U.S. Mint, a bureau of the U.S. Treasury Department. The
Mint’s gold holdings are stored at seven locations around the country. About 94 % of the gold
stock, or about 245 million ounces, is held in three “deep storage” facilities at, Fort Knox, KY;
West Point, NY; and Denver, CO. Much smaller amounts, totaling about 9,000 ounces, are held
among the mint in Philadelphia, PA, at an offsite warehouse, and the U.S. Mint headquarters in
Washington. In addition to Mint holdings, the Federal Reserve Bank’s New York branch holds
about 13 million ounces of gold for the Treasury.
The vast majority of the U.S. gold stock, or about 259 million ounces, is in the form of bullion,
and the remainder, or about 3 million ounces is in gold coins. By law, the U.S. gold stock is
valued on the government’s books at $42.22 per ounce, for a total value of slightly more than $11
billion in early 2002. 2 The current free market value of the U.S. gold stock would be about $77
billion, at a market price of gold of $300 per ounce.

Table 1. U.S. Official Gold Holdings
( At book value, in millions of dollars)
1996
1997
1998
1999
2000
2001
11,048
11,047
11,047
11,046
11,048
11,046
Source: U.S. Treasury Department

What is the U.S. Gold Stock Used For?
The short answer is: not very much. For clarity, however, let us examine several government
operations, including some that are sometimes thought to use gold.
The U.S. Mint
If one looks at the data on gold stock holdings of the U.S. Mint, one will see that the size of the
gold stock, while generally stable, does fluctuate slightly. This small movement occurs in a
component of the U.S. gold stock called the “working stock.” This is gold that is acquired and

1 A fine troy ounce is equal to about 1.097 standard ( or aviordupois) ounces. A troy ounce is therefore heavier than a
standard ounce. In this report all references to ounces are fine troy ounces.
2 This book value price was established in 1973. At its inception this price was a meaningless vestige of the Bretton
Woods system of international payments that had been effectively abandoned in 1971. But it remains the accounting
convention for valuing U.S. official gold.
Congressional Research Service
1

Gold: Uses of U.S. Official Holdings

used to make various commemorative coins mandated by the U.S. Congress to honor people,
places, and historical events (e.g., a recent issue commemorates the 2002 winter Olympic games).
Gold is purchased, it is transformed into coins, and the coins are sold to the public. As these
transactions occur, the gold stock will fluctuate accordingly. Fluctuations in the “working stock”
amount to only one or two million dollars each year. The U.S. Mint’s gold holdings are audited
each year by the Department of the Treasury’s Office of Inspector General.
The Federal Reserve
The Federal Reserve system owns no gold and conducts no official transactions using gold. The
Fed does hold gold for others, however. As noted above, the Fed holds a small amount of gold for
the Treasury, but it also holds a stock of what is called “earmarked” gold that is held in custody
for other official entities such as foreign governments and central banks. Earmarked gold is all
held at the New York branch of the Fed and is not counted as part of the official U.S. gold stock.
It is valued at the U.S. official price of $42.22 and currently totals nearly $9 billion. The stock of
earmarked gold has fallen substantially in recent years.
A possible source of confusion about the Fed’s use of gold is the “gold certificate account” on the
Fed’s balance sheet, currently valued at $11.04 billion. This account comprises certificates that
have been issued to the Fed by the Treasury and each is backed by an amount of the gold held by
the Treasury. For each gold certificate issued, the Fed, in turn, credits the Treasury’s deposit
account at the Fed by an amount priced at the statutory gold price of $42.22 per ounce. Through
this intra-governmental transaction the Treasury acquires cash backed by an otherwise idle asset.
This practice is called “monetizing” the gold stock, and occurs without the government selling or
lending any of its gold stock on the open market. Nor is ownership or control of any of the gold
stock transferred from the Treasury to the Fed. The Treasury has in effect created an intra-
governmental “mortgage” on its gold holding to gain an improved liquidity position.
Currently the U.S. gold stock is fully monetized, with the Fed’s gold certificate account equal to
the legal value of the official U.S. gold stock, or about $11 billion. If the Treasury acquires more
gold, then more gold certificates could be issued. If gold holdings fall, the Treasury must redeem
an equal value of gold certificates from the Fed, reducing the Treasury’s deposit at the central
bank. If the rule for valuing the gold holdings changes (e.g., an increase in the official $42.22
price), so could the level of gold certificates.
Because the gold stock does not exhibit much fluctuation in volume or value, neither does the
Fed’s gold certificate account. This is the Fed’s only operational link to the gold stock and it does
not involve any market transaction in gold.
The Exchange Stabilization Fund
The Exchange Stabilization Fund (ESF) is an agency of the U.S. Treasury created in 1934 to
stabilize the exchange value of the dollar on world markets. In recent years the ESF has also been
used to fund foreign economic support programs. The resources of the ESF include dollar
denominated assets (e.g., cash and Treasury securities), assets denominated in foreign currencies
(e.g., Euro and Yen), and special drawing rights (SDR). It uses these assets to buy and sell in
foreign exchange markets with the intent of influencing the dollar and other currencies’
international exchange value. Over its history the ESF has dealt in gold, but has not owned or
transacted in gold since 1978.
A possible source of confusion over the ESF’s connection to gold is the use of the SDR holdings.
The SDR is an artificial international reserve asset that was created by the International Monetary
Congressional Research Service
2

Gold: Uses of U.S. Official Holdings

Fund (IMF) in 1969, and allocated to each member to supplement its international reserves. The
value of the SDR was once based on the price of gold, but is now determined in reference to a
basket of international currencies. While the SDR was at one time referred to as “paper gold,” it
does not represent any claim on gold held by the IMF or any of its members. By law the ESF is
the holder of the U.S. allocation of SDRs. In practice the U.S. has little need for the SDR to settle
its international payments, but it does make use of its SDR assets by transforming them into a
more liquid and more useable form.
In a maneuver similar to the Treasury’s use of its gold holdings, the ESF has a relationship with
the Fed that allows it to monetize its SDR assets. In an amount up to the current dollar value of
the SDR holdings, the ESF can issue to the Fed an SDR certificate that is a claim against the SDR
assets. The Fed, in turn, transfers to the ESF a dollar denominated asset ( e.g., cash or Treasury
securities ) which the ESF can spend more readily in its foreign exchange dealings. SDR
certificates will then appear as an asset on the Fed’s balance sheet, but as a liability on the ESF’s
balance sheet.
The ESF’s use of this arrangement increases and decreases with its need for dollar denominated
assets. If the need for such assets falls, the ESF will buy the SDR certificates back from the Fed,
exchanging cash or Treasury securities for the SDR certificate. In the mid 1990s the ESF had
fully monetized its SDR holdings, generating an SDR certificate account worth about $9.2 billion.
In recent years, however, with few liquidity problems, the ESF has moved to reduce its SDR
certificate obligations, steadily buying those certificates back from the Fed, bringing the account
balance down to $2.2 billion in 2001. The Fed, in turn, has received an inflow of cash and
Treasury securities and an outflow of SDR certificates. These transactions are purely internal to
the U.S. government, do not affect any private market, and do not involve any transactions in
gold.
The Gold Standard
The current U.S. monetary system is based on the use of paper money that is backed only by the
“full faith and credit” of the federal government. This so called “fiat” currency is not valued in or
convertible to gold or any other precious commodity. This has not always been the case. Over
most of its history the U.S. has been on some type of metallic standard. Paper money proliferated
under these metallic standards, but was most often valued and redeemable in some amount of
gold or silver.
By 1879 a true gold standard emerged, in which the U.S. currency was effectively valued and
convertible exclusively in terms of gold. The Gold Standard Act of 1900 marked the official
adoption of a gold standard, valuing the currency at $20.67 per ounce of gold.3
The pure gold standard ended with the Great Depression. In 1933 the federal government faced a
severe banking crisis with a high risk of widespread runs on banks and, in turn, on the gold stock.
Another economic problem needing resolution at this time was that adherence to the gold
standard for international payments precluded pursuing the policy of strong monetary stimulus
that the economy needed to help break the grip of economic depression. Monetary stimulus
lowers interest rates and this would tend to accelerate the export of gold as investors look for
higher yields abroad. In addition, the creation of more currency would tend to undermine
confidence in the convertibility of dollars into gold. Together these forces would make it more

3 An act to define and fix the standard of value , to maintain the parity of all forms of money issued or coined by the
United states, to refund the public debt, and for other purposes, 301 Stat. 45, March 1900. Also known as the “Gold
Standard Act”.
Congressional Research Service
3

Gold: Uses of U.S. Official Holdings

difficult to maintain the dollar at its legal gold value. Maintaining the gold standard imparted a
strong contractionary bias to domestic economic policy.
What emerged in 1934 was what has been called a “quasi’ gold standard. The dollar was devalued
in its gold content to $35 per ounce. This devaluation in the gold value of the dollar gave the Fed
some room for applying monetary stimulus to the struggling economy. However, convertibility
into gold applied only for official international transactions. Domestic convertibility was ended
and ownership of all gold bullion and coin was vested in the Treasury Secretary.4
This quasi gold standard endured into the 1970s. In practice only limited amounts of gold were
transferred under this system, since countries largely relied on currencies that were readily
convertible into foreign exchange to settle payment balances. In the post-World War II era of
rapidly expanding international trade, the currency of choice was most often the dollar. However,
U.S. economic policies over this period led to such a substantial accumulation of foreign holdings
of dollars that confidence in convertibility to gold at the legal par value was ultimately
undermined. The U.S. government steadily moved away from redeeming dollars for gold in
international transactions. Attempts to reconstitute this system failed. In early 1973 the Treasury
devalued the dollar to $42.22 per ounce, but no attempt was made to maintain the new parity and
the dollar was left to float in its international value as it continues to do today. In 1975 citizens
were again allowed to own gold. In 1976 the government officially removed the definition of the
dollar in terms of gold from statute5.
Conclusion
For the last 30 years the public gold stock has not played any important role in the domestic or
international monetary affairs of the nation. Events had steadily pushed the government to the
realization that tying the currency to gold had proved to be a significant impediment to providing
the liquidity a growing economy needed and exposed the economy to periodic crises. Moreover it
was becoming clear that maintaining stable monetary conditions (i.e., keeping inflation low) did
not hinge on a linking of the currency to gold.
Gold, while not actively used as a monetary medium, does remain a significant reserve asset for
the United States (particularly if valued at the much higher market price). However, the U.S. has
shown no inclination to substantially increase or decrease its gold holdings over the last 30 years.
In the mid-1990s several European governments did sell off some of their gold holdings in an
effort, as they saw it, to make better use of an underutilized asset. But this practice largely ended
in 1999 when most major central banks agreed to limit gold sales to no more than 400 tons per
year for the five years ending in 2004. That agreement is also a re-affirmation by these nations of
an on-going commitment to holding sizable reserves of gold.6
Why continue to hold an asset that would not seem to be earning the highest possible financial
return? One can conjecture that most nations still see gold as the ultimate form of payment and
therefore holding significant amounts of gold will continue as a last-ditch hedge against economic
catastrophe. In times of severe crisis fiat money could be shunned, while gold is always likely to
be accepted.

4 Gold Reserve Act of 1934, 48 Stat. 337, January 1934.
5An Act to provide for amendment of the “Bretton Woods Agreement Act,” 90 Stat. 2660, October 1976.
6 An agreement reached in Washington D.C. by the European Central Bank and the central banks of 14 European
countries on September 26, 1999.
Congressional Research Service
4

Gold: Uses of U.S. Official Holdings

Author Information

Craig K. Elwell

Specialist in Macroeconomic Policy

Disclaimer
This document was prepared by the Congressional Research Service (CRS). CRS serves as nonpartisan
shared staff to congressional committees and Members of Congress. It operates solely at the behest of and
under the direction of Congress. Information in a CRS Report should not be relied upon for purposes other
than public understanding of information that has been provided by CRS to Members of Congress in
connection with CRS’s institutional role. CRS Reports, as a work of the United States Government, are not
subject to copyright protection in the United States. Any CRS Report may be reproduced and distributed in
its entirety without permission from CRS. However, as a CRS Report may include copyrighted images or
material from a third party, you may need to obtain the permission of the copyright holder if you wish to
copy or otherwise use copyrighted material.

Congressional Research Service
RS21204 · VERSION 3 · NEW
5