Stafford Act Declarations for Extreme Heat

Stafford Act Declarations for Extreme Heat

INSIGHTi

Stafford Act Declarations for Extreme Heat
June 20, 2024
The United States has experienced record-setting high temperatures thus far in 2024, continuing a trend
observed in 2023—the hottest year on record, according to the National Aeronautics and Space
Administration and the National Oceanic and Atmospheric Administration (NOAA). U.S. government
authorities and scientific organizations find that average temperatures will likely increase and anticipate
extreme heat episodes of greater frequency, duration, and intensity due to climate change, among other
factors. Amid these developments, some Members of Congress, nonfederal governments, labor unions,
and nonprofit groups have advocated for extreme heat to qualify for assistance pursuant to a declaration
under the Robert T. Stafford Disaster Relief and Emergency Assistance Act (Stafford Act, 42 U.S.C.
§5121 et seq.), as administered by the Federal Emergency Management Agency (FEMA).
Stafford Act Declarations: Definitions and Assistance
The Stafford Act authorizes the President to provide federal assistance to affected jurisdictions by
declaring a specific episode of extreme heat to be an “emergency” or a “major disaster.”
An emergency provides a relatively narrow range of assistance and is broadly defined as
any occasion or instance for which, in the determination of the President, Federal assistance is
needed to supplement State and local efforts and capabilities to save lives and to protect property
and public health and safety, or to lessen or avert the threat of a catastrophe.
A major disaster provides a broader range of assistance and is defined narrowly as
any natural catastrophe (including any hurricane, tornado, storm, high water, winddriven water, tidal
wave, tsunami, earthquake, volcanic eruption, landslide, mudslide, snowstorm, or drought), or,
regardless of cause, any fire, flood, or explosion, in any part of the United States, which in the
determination of the President causes damage of sufficient severity and magnitude to warrant major
disaster assistance.
Stafford Act Declarations: Procedures to Evaluate Requests
A governor or tribal chief executive must generally request a declaration, which FEMA evaluates. FEMA
makes a recommendation to the President, who has the sole authority to issue a declaration.
Congressional Research Service
https://crsreports.congress.gov
IN12384
CRS INSIGHT
Prepared for Members and
Committees of Congress

Congressional Research Service
2
Historically, most Stafford Act declarations provide assistance for sudden-onset hazards that caused
structural damage, such as hurricanes. This may be attributable in part to FEMA regulations, which
specify that the agency assesses the need for Stafford Act assistance for major disasters based largely on
the uninsured disaster-related costs incurred during a specific period of time. (Evaluations of emergency
declarations are more subjective.) Extreme heat is defined differently by different U.S. agencies, and
establishing related costs—as well as the specific the duration of an episode—may challenge FEMA’s
procedures. Furthermore, official counts of heat-related deaths are generally understood to be
underestimates due to inconsistency in diagnosis and reporting on death certificates, while estimates using
statistical models often come out months after an incident.
These regulations pertain only to FEMA’s recommendation; they do not restrict the President’s authority
to issue a Stafford Act declaration.
Historical Requests for Stafford Act Declarations for
Extreme Heat
Past Presidents have denied all requests for Stafford Act declarations for incidents explicitly including
extreme heat. In each case, FEMA explained that the “severity and magnitude” of the incident was
insufficient to warrant a declaration.
• In 1980, the governor of Missouri requested two major disaster declarations for extreme heat
and drought.
• In 1995, the governor of Illinois requested a major disaster declaration for a Chicago “heat
wave” that is estimated to have directly caused over 700 deaths.
• In 2022, the governor of California requested a major disaster declaration for a “heat dome”
and resulting wildfires. The declaration and subsequent appeal were denied. FEMA further
reported that the agency does not consider the request to be for extreme heat, as wildfires
caused the damage for which the state sought assistance and “FEMA precedent is to evaluate
discrete events and impacts, not seasonal or general atmospheric conditions.”
Potential Stafford Act Declarations for Extreme Heat
Despite previous declaration denials for extreme heat, recent FEMA officials have affirmed that such a
declaration is possible under current law. In September 2023, FEMA Administrator Deanne Criswell
testified before Congress that a declaration for extreme heat is possible if warranted:
The Stafford Act does not need to be amended to include extreme heat. We base our decisions on a
number of factors, mostly on what—does it exceed the capacity of the state and local jurisdictions.
If the response to an extreme heat incident exceeds the capacity of a state and local jurisdiction, they
are very open to submit a disaster declaration request. And we will consider that based on whether
or not it exceeds their capacity.
Some Members of Congress have introduced legislation amending the Stafford Act to explicitly include
extreme heat in the definition of major disaster.
If a President issued a Stafford Act declaration for an episode of extreme heat, FEMA could potentially
provide different forms of assistance, as detailed in CRS Report R46873, Emergency Response to Extreme
Heat: Federal Financial Assistance and Considerations for Congress.

Congressional Research Service
3

Policy Considerations
Congress may consider the following issues relevant to potential Stafford Act declarations for extreme
heat:
• Stafford Act declarations for extreme heat could further strain FEMA’s already broad
response efforts and staffing shortage.
• FEMA’s expertise and experience with extreme heat is limited compared to other federal
agencies, including NOAA and the Centers for Disease Control and Prevention. Excepting
the COVID-19 pandemic, FEMA has limited experience leading response to incidents that
primarily threaten human health.
• A declaration is not the only means through which FEMA can deliver assistance for extreme
heat. For example, FEMA is able to provide assistance to communities for preparedness and
mitigation measures without a declaration.
• Extreme heat may also compound or increase risks of other hazards. For example, some
experts have recently warned that extreme heat episodes may strain certain power supply
systems in the United States, leading to rolling blackouts or power losses that could pose a
severe threat to human health. President George W. Bush declared Stafford Act emergencies
for several states for power outages in August 2003 following supply strains attributed, in
part, to air conditioning use during extreme heat.

Author Information

Erica A. Lee
Bruce R. Lindsay
Specialist in Emergency Management and Disaster
Specialist in American National Government
Recovery

Disclaimer
This document was prepared by the Congressional Research Service (CRS). CRS serves as nonpartisan shared staff
to congressional committees and Members of Congress. It operates solely at the behest of and under the direction of
Congress. Information in a CRS Report should not be relied upon for purposes other than public understanding of
information that has been provided by CRS to Members of Congress in connection with CRS’s institutional role.
CRS Reports, as a work of the United States Government, are not subject to copyright protection in the United
States. Any CRS Report may be reproduced and distributed in its entirety without permission from CRS. However,
as a CRS Report may include copyrighted images or material from a third party, you may need to obtain the
permission of the copyright holder if you wish to copy or otherwise use copyrighted material.

IN12384 · VERSION 1 · NEW