Establishing Data Standards and Measuring Building Use: Select Provisions of the Telework Transparency Act of 2024 (S. 4043)

Establishing Data Standards and Measuring Building Use: Select Provisions of the Telework Transparency Act of 2024 (S. 4043)

INSIGHTi

Establishing Data Standards and Measuring
Building Use: Select Provisions of the
Telework Transparency Act of 2024 (S. 4043)
April 30, 2024
On March 21, 2024, Senator Gary Peters introduced the Telework Transparency Act of 2024 (S. 4043).
The bill, cosponsored by Senator Joni Ernst, was referred to the Senate Committee on Homeland Security
and Governmental Affairs on the same day, and no further action has been taken. S. 4043 would require
federal agencies to monitor their employees’ use of telework and to collect and publicly report telework-
related data. This Insight discusses selected provisions that relate to telework data standards, including
office building utilization data.
Select Telework Data Provisions
S. 4043 includes several provisions that would involve the use of data to monitor federal telework. The
Office of Personnel Management (OPM) would be required to establish data standards that would (1)
enable the tracking of telework usage within payroll systems; (2) permit data collection by OPM for its
reporting to Congress under Title 5, Section 6506, of the U.S. Code; and (3) support an online tool to
present the telework data that is to be reported by agencies. OPM may choose to fulfill its reporting
requirements to Congress through the online tool. If S. 4043 were enacted, OPM would have two years to
develop an online tool that would make standardized telework data publicly available.
OPM currently has data standards for human resources, payroll, and training data, including some
standards for telework data contained in payroll records. OPM describes its data standards program as
“providing standardized definitions and characteristics for federal civilian employment data elements
across a wide range of customers to facilitate the collection, processing, use, and dissemination of such
data.” While OPM oversees these data standards, agencies use the data standards for human resources
reporting, including to transmit telework-related data to OPM. Reported data are part of OPM’s Enterprise
Human Resources Integration (EHRI) data warehouse. OPM calls the EHRI data warehouse a “premier
source for integrated Federal workforce information. The system currently collects, integrates, and
publishes data for 2.0 million Executive Branch employees on a bi-weekly basis, supporting agency and
governmentwide analytics.”
Congressional Research Service
https://crsreports.congress.gov
IN12352
CRS INSIGHT
Prepared for Members and
Committees of Congress

Congressional Research Service
2
For FY2024, OPM expected agencies to begin reporting on a category separate from telework called
remote work in which employees do not regularly return to agency worksites during each pay period.
OPM’s memorandum to agencies on remote work data reporting suggests that implementing new data
requirements within systems provided by various shared service providers may involve long lead times.
In 2022, the Government Accountability Office (GAO) reported on OPM’s long-standing challenges
related to monitoring errors in agencies’ telework data reporting, establishing internal controls for
telework data quality, and integrating payroll data into the EHRI data warehouse. As a result of these
issues, GAO found that OPM’s annual reporting to Congress does not precisely assess telework usage
across agencies. S. 4043 would potentially address these concerns by requiring OPM to establish
processes for ensuring data quality, including conformity to the data standards, and for providing
feedback to agencies.
Building Utilization Data
S. 4043 would require agencies to establish methods for measuring the impact of telework on office
building space utilization. Agencies are currently required to identify and dispose of building space that is
underutilized (partly empty) or unutilized (vacant) in order to avoid unnecessary operating, maintenance,
and rental costs. However, agencies have struggled to identify and dispose of underutilized and unutilized
space in a timely manner, despite the implementation of legislation and executive branch initiatives
designed to streamline disposition. Recent studies suggest that building utilization rates have fallen to
record lows as a result of expanded telework opportunities—in some cases below 10% of capacity—and
that agencies lack appropriate benchmarks for measuring utilization rates in high-telework environments.
To address these issues, S. 4043 would require OMB, in coordination with the General Services
Administration (GSA) and the Federal Real Property Council (FRPC), to:
• develop benchmarks for measuring office building space utilization that account for the
use of telework,
• issue guidance to executive agencies for collecting occupancy data regarding the average
daily onsite attendance for each building they own or lease, and
• establish for each executive agency a building space utilization rate goal of at least 60%.
Agencies would be required to establish systems that track office building utilization rates and to report
those rates in their annual budget justifications. GAO would be required to audit agencies’ office building
utilization rates, along with other telework data. Agencies would also be required to establish indicators of
how telework affects the cost of operations and the management of real and personal property. OMB, in
coordination with OPM and GSA, would be required to issue guidance on developing these and other
indicators. Agency heads would be required to report on their ability to dispose of or consolidate
underutilized property and on the steps they have taken or plan to take to meet their target utilization
rates.
Issues for Congress
Given GAO’s previous reporting on OPM’s data integration challenges and its other reporting on
applying data standards to authoritative online sources of federal data, Congress may consider expanding
GAO’s role in S. 4043 to evaluate the implementation of telework data standards and the ability of OPM
to integrate telework data in the EHRI data warehouse.
A recent analysis by the Public Buildings Reform Board (PBRB)—an independent body that develops
disposal recommendations under a real property pilot program—concluded that the government may

Congressional Research Service
3
realize the greatest cost and space reductions through consolidation projects. Some agencies have opposed
consolidating space because telework policies might change in the future, resulting in more employees
working on site. Congress may consider directing the FRPC and the PBRB to develop a methodology that
agencies could use to identify consolidation opportunities while taking potential telework policy changes
into account.

Author Information

Natalie R. Ortiz
Garrett Hatch
Analyst in Government Organization and Management
Specialist in American National Government

Disclaimer
This document was prepared by the Congressional Research Service (CRS). CRS serves as nonpartisan shared staff
to congressional committees and Members of Congress. It operates solely at the behest of and under the direction of
Congress. Information in a CRS Report should not be relied upon for purposes other than public understanding of
information that has been provided by CRS to Members of Congress in connection with CRS’s institutional role.
CRS Reports, as a work of the United States Government, are not subject to copyright protection in the United
States. Any CRS Report may be reproduced and distributed in its entirety without permission from CRS. However,
as a CRS Report may include copyrighted images or material from a third party, you may need to obtain the
permission of the copyright holder if you wish to copy or otherwise use copyrighted material.

IN12352 · VERSION 1 · NEW