Safe Drinking Water Act (SDWA) Cybersecurity Provisions

Safe Drinking Water Act (SDWA) Cybersecurity Provisions

INSIGHTi

Safe Drinking Water Act (SDWA)
Cybersecurity Provisions
January 29, 2024
The disruption of a safe and reliable water supply remains a concern related to the protection of public
health. Several events have increased attention to water system security, including “malicious cyber
activities” affecting devices used by some systems. Water systems are one type of critical infrastructure
(CI) covered by broader efforts to improve CI security. Executive Order 13636 designated the U.S.
Environmental Protection Agency (EPA) as the lead agency responsible for water sector security,
including cybersecurity.
SDWA and Water Systems
To address intentional acts that may threaten water systems, Congress added provisions to the Safe
Drinking Water Act (SDWA) to support the safety of water supplies. SDWA is the key federal law for
protecting public water supplies; it applies to the nearly 144,000 privately and publicly owned water
systems that provide piped water to at least 15 service connections or that regularly serve at least 25
people.
Of these systems, roughly 49,400 (34%) are community water systems (CWS), which serve the same
residences year-round. Most CWS (81%) are relatively small, serving 3,300 or fewer individuals. These
systems provide water to 7.6% of the total population served by CWS. Fewer than 9% of CWS serve
10,000 or more individuals, but these systems provide water to 83% of the population served (nearly 260
million individuals).
Due to the number of systems and range of system sizes, cybersecurity challenges faced by the sector may
differ from other CI sectors (e.g., the energy sector) that have fewer providers. For example, smaller
systems may lack resources to assist them with cybersecurity.
SDWA Water System Security Provisions
Water system security provisions, which are primarily in SDWA Part D “Emergency Powers,” range from
risk and resilience assessment and emergency response planning to penalties against those who tamper or
attempt to tamper with water systems.
Congressional Research Service
https://crsreports.congress.gov
IN12311
CRS INSIGHT
Prepared for Members and
Committees of Congress

Congressional Research Service
2
In 2002, P.L. 107-188 amended SDWA to add Section 1433 that required CWS serving 3,300 or more
individuals to (1) assess the vulnerabilities of their system, including the “electronic, computer or other
automated systems which are utilized by the public water system,” to terrorist attacks or other intentional
acts that could disrupt the provision of a safe and reliable water supply, (2) submit assessments to EPA,
and (3) develop emergency response plans based on their assessments. EPA was directed to provide
guidance to small systems (serving fewer than 3,300 people) on how to conduct assessments, prepare
emergency response plans, and address threats. As initially added to SDWA, Section 1433 did not require
CWS to update their assessments.
In 2018, P.L. 115-270 amended Section 1433 to require CWS serving more than 3,300 people to conduct
risk and resilience assessments. Under the revised section, CWS are required to assess risk from natural
hazards, in addition to malevolent acts. As a part of their assessment, CWS are required to evaluate the
resilience of their current physical infrastructure, including “electronic, computer, or other automated
systems (including the security of such systems)” and their management practices, as well as financial
capacity to respond to these risks.
For Section 1433, “resilience” is defined as “the ability of a community water system ... to adapt to or
withstand the effects of a malevolent act or natural hazard without interruption to ... a system’s function,
or if function is interrupted, to rapidly return to a normal operating condition.” Based on their
assessments, CWS must also develop emergency response plans. CWS must certify their assessments and
submit the certifications to EPA by deadlines specific to their communities’ size. CWS serving 3,300 or
more individuals must review their risk assessments every five years and update them, if needed. Risk and
resilience assessments and emergency response plans are voluntary for small CWS. EPA is required to
provide guidance and technical assistance to small CWS on how to conduct assessments, prepare
emergency response plans, and address threats.
Other SDWA Provisions Related to Cybersecurity
Congress has established SDWA assistance programs that can support a range of objectives, including
water system cybersecurity. Authorized by Section 1452, the Drinking Water State Revolving Fund
(DWSRF) is the key federal financial assistance program to help water systems finance infrastructure
projects needed to comply with drinking water regulations and to meet health protection objectives. These
include projects that address the “vulnerability of a water system to disruption of safe water delivery,
whether natural or of human origin, [and the] capability to recover from disruption of safe water
delivery.” Further, states are authorized to set aside portions of their annual funding allotment for water
system capacity development, and strategy development. According to EPA guidance, these activities may
include “security inspections and exercises (including physical infrastructure and cybersecurity
assessments),” which could be a part of efforts to “develop cybersecurity effective practices or measures.”
Other SDWA financial assistance programs are intended to address water system cybersecurity. SDWA
Section 1433(g) directs EPA to establish a technical assistance and grant program to address CWS
resiliency. As amended by P.L. 117-58, SDWA Section 1442(b) authorizes EPA to provide grants to states
or water systems in emergencies, including from cybersecurity events, “to assist in responding to and
alleviating any emergency situation.” SDWA Section 1459F directs EPA to establish a grant program for
water systems serving 10,000 or more individuals to improve resilience to natural hazards and to reduce
cybersecurity vulnerabilities. SDWA Section 1459G requires EPA, subject to appropriations, to study
technologies including those to address cybersecurity vulnerabilities, and requires EPA to establish a
technology grant program for either water systems serving 100,000 or fewer individuals or small and
disadvantaged water systems.
P.L. 117-58 also amended SDWA to add Section 1420A, which required EPA, in coordination with the
Department of Homeland Security Cybersecurity and Infrastructure Security Agency (CISA) to develop a

Congressional Research Service
3
framework to identify water systems that, if degraded or rendered inoperable due to an incident, would
lead to significant public health and safety impacts; and required EPA and CISA to develop a plan to
support water systems. Pursuant to Section 1420A, EPA published a prioritization framework and a
technical cybersecurity support plan.

Author Information

Elena H. Humphreys

Analyst in Environmental Policy

Disclaimer
This document was prepared by the Congressional Research Service (CRS). CRS serves as nonpartisan shared staff
to congressional committees and Members of Congress. It operates solely at the behest of and under the direction of
Congress. Information in a CRS Report should not be relied upon for purposes other than public understanding of
information that has been provided by CRS to Members of Congress in connection with CRS’s institutional role.
CRS Reports, as a work of the United States Government, are not subject to copyright protection in the United
States. Any CRS Report may be reproduced and distributed in its entirety without permission from CRS. However,
as a CRS Report may include copyrighted images or material from a third party, you may need to obtain the
permission of the copyright holder if you wish to copy or otherwise use copyrighted material.

IN12311 · VERSION 1 · NEW