DOD Concerns About the FCC-Approved Ligado Network

DOD Concerns About the FCC-Approved Ligado Network

INSIGHTi

DOD Concerns About the FCC-Approved
Ligado Network
Updated February 5, 2021
On April 20, 2020, the Federal Communications Commission (FCC) unanimously approved an
application by Ligado Networks LLC (Ligado) to “deploy a low-power [9.8 decibel watts (dBW)]
terrestrial nationwide network in the 1526-1536 MHz, 1627.5-1637.5 MHz, and 1646.5-1656.5 MHz
bands [of the electromagnetic spectrum] that will primarily support Internet of Things (IoT) services.”
These frequency bands are traditionally used for satellite operations. The Department of Defense (DOD)
opposed this decision—along with the Department of Homeland Security, Department of Transportation
(DOT), Department of Interior, Department of Justice, the Federal Aviation Administration (FAA), and
others. That opposition related to concerns that Ligado’s proposed network could interfere with signals
from satellites to Global Positioning System (GPS) receivers. Congress may consider federal agency
concerns, including DOD concerns related to mission-critical systems and the FCC’s response, as it
conducts oversight of the FCC’s ruling. Congress may also consider broader issues related to fifth
generation (5G) mobile technologies, such as the allocation of spectrum among competing users and the
impact of spectrum decisions on national security.
DOD Concerns and Related Studies on GPS Interference
In both its formal response to the FCC’s ruling and its May 6, 2020, testimony before the Senate Armed
Services Committee (SASC), DOD cited two primary studies that shaped its belief that the Ligado
network “would cause unacceptable operational impacts and adversely affect the military potential of
GPS”: a 2018 DOT study and a 2016 classified study conducted by the U.S. Air Force (USAF). The 2018
DOT study assessed the extent to which cellular base stations with power levels ranging from -6 dBW to
31 dBW and cellular handsets of -7 dBW would interfere with GPS. (At the time of the study, Ligado
proposed a base station power level of 32 dBW and a handset power level of -7 dBW.) The study
concluded that base stations at the proposed Ligado frequency would have to be limited to 9.8 dBW to
ensure the protection of certified avionics in most scenarios. In conversation with CRS, DOT officials
asserted that the protection of other categories of GPS equipment—including noncertified aviation,
general location/navigation, high precision, timing, and space-based—could not be assured at this power
level. DOD additionally recommended “that proposals for use of bands adjacent to GPS should not be
approved unless they meet the transmission power levels described in the [DOT test].” Based on the DOT
study findings for certified aviation, Ligado submitted an amended application to the FCC, reducing its
Congressional Research Service
https://crsreports.congress.gov
IN11400
CRS INSIGHT
Prepared for Members and
Committees of Congress

Congressional Research Service
2
proposed power levels to 9.8 dBW. Per the FCC ruling, Ligado also agreed to maintain a 23-MHz guard-
band of unused spectrum designed to separate its transmissions from GPS, thus attempting to mitigate
potential interference.
There are limited details available in the public domain that describe the technical parameters of the 2016
classified USAF study; however, the USAF’s formal response to the FCC ruling notes that its study,
which specifically tested potential interference with military GPS receivers, “supported the conclusions
drawn from the DOT testing ... conducted during the same month.” This suggests that the study may not
provide evidence that a Ligado network—using the FCC-approved specifications from the company’s
2018 amended application—would necessarily interfere with GPS. Furthermore, according to FCC
Chairman Ajit Pai, DOD neither submitted nor attempted to submit the classified USAF study to the FCC
for consideration. Nonetheless, DOD has continued to cite these studies in its public objections to the
ruling.
Dr. Michael Griffin, Under Secretary of Defense for Research and Engineering (USD R&E), has
additionally asserted that any ground transmissions—regardless of power level—“would drown out the
very weak signals that come from [GPS] satellites,” likening the effect of the proposed Ligado network
on GPS to attempting to listen to the rustling of leaves while 100 jet aircraft simultaneously took off.
Statutory Obligations with Regard to Potential GPS Interference
DOD has noted its statutory obligation, pursuant to 10 U.S.C. §2281, to object “to any restriction on the
GPS System proposed by the head of a department or agency of the United States outside DOD that
would adversely affect the military potential of GPS” [emphasis added]. Although the DOT and the
USAF study do not appear to provide assured evidence that a Ligado network would adversely affect
military GPS, neither definitively ruled out the potential for adverse effects. As a result, Secretary of
Defense Mark Esper concluded, “Consistent with my statutory responsibilities, I believe there are too
many unknowns and the risks are far too great to federal operations to allow Ligado’s proposed system to
proceed.”
DOD has additionally noted that Section 1698 of the National Defense Authorization Act for Fiscal Year
2017 (P.L. 114-328)—codified at Section 343 of the Communications Act—prevents the FCC from
approving commercial terrestrial operations in the bands proposed by Ligado “until 90 days after the
Commission resolves concerns of widespread harmful interference by such operations to covered GPS
devices.” DOD asserts that the FCC did not resolve such concerns prior to approving Ligado’s
application; paragraph 130 of the FCC ruling provides the FCC’s justification for its belief that the
concerns were “effectively resolved.”
FCC Response to Concerns About Potential GPS Interference
Although the FCC has not issued a formal response to DOD, Commissioner Brendan Carr noted in a
statement accompanying the FCC’s decision that “after a thorough and multi-year review, the FCC’s
professional staff of engineers and other experts determined that we can advance America’s 5G leadership
while protecting GPS and other adjacent band services.” Commissioners Jessica Rosenworcel and
Geoffrey Starks termed the decision “an extremely close call,” but similarly noted in their joint statement
of concurrence that, despite the concerns of DOD and others about potential GPS interference, “in the
end, we are compelled to support the expert technical analysis done by the [FCC’s] engineering staff.”
Legislative Activity
The FY2021 National Defense Authorization Act (P.L. 116-283) contains five Ligado- or GPS
interference-related provisions:

Congressional Research Service
3

1. Section 1611 requires DOD to develop a plan for a resilient and survivable positioning,
navigation, and timing capability within two years. This provision would allow DOD to
reprogram resources as needed to develop the plan.
2. Section 1661 prohibits funds for retrofitting GPS devices or networks that use GPS for
the purposes of “[mitigating] harmful interference from commercial terrestrial operations
using the 1526–1536 megahertz band, the 1627.5–1637.5 megahertz band, or the 1646.5–
1656.5 megahertz band” (i.e., the bands approved for the Ligado network).
3. Section 1662 prohibits funding for contracts with entities “that [engage] in commercial
terrestrial operations using the 1525–1559 megahertz band or the 1626.5–1660.5
megahertz band unless the Secretary has certified to the congressional defense
committees that such operations do not cause harmful interference to a Global
Positioning System device of the Department of Defense.”
4. Section 1663 directs the Secretary of Defense to seek an independent technical
assessment of the FCC’s Ligado authorization order (FCC 20-48) from the National
Academy of Sciences. This assessment is to “evaluate the potential harmful interference
concerns relating to Global Positioning System devices,” review potential mitigation
measures, and provide associated recommendations to the department.
5. Section 1664 prohibits the Secretary of Defense from obligating or expending funds to
comply with the FCC’s Ligado authorization order until the Secretary submits to the
congressional defense committees an estimate of the cost associated with any potential
interference-mitigation measures.

Author Information

Kelley M. Sayler
John R. Hoehn
Analyst in Advanced Technology and Global Security
Analyst in Military Capabilities and Programs

Disclaimer
This document was prepared by the Congressional Research Service (CRS). CRS serves as nonpartisan shared staff
to congressional committees and Members of Congress. It operates solely at the behest of and under the direction of
Congress. Information in a CRS Report should not be relied upon for purposes other than public understanding of
information that has been provided by CRS to Members of Congress in connection with CRS’s institutional role.
CRS Reports, as a work of the United States Government, are not subject to copyright protection in the United
States. Any CRS Report may be reproduced and distributed in its entirety without permission from CRS. However,
as a CRS Report may include copyrighted images or material from a third party, you may need to obtain the
permission of the copyright holder if you wish to copy or otherwise use copyrighted material.

IN11400 · VERSION 7 · UPDATED