“Skinny Labels” for Generic Drugs Under Hatch-Waxman

“Skinny Labels” for Generic Drugs Under Hatch-Waxman

"Skinny Labels" for Generic Drugs Under Hatch-Waxman

Updated January 28, 2026 (IF12700)

New "brand-name" drugs are often protected from generic competition by patents. In general, a drug manufacturer intending to market a generic version of a brand-name drug must either wait for those patents to expire or challenge the validity or applicability of the patents in court.

While some drug patents cover the active ingredient itself, other patents cover different things related to the drug, such as a method of using the drug. When some methods of using a drug are still patented but other uses are not, the Hatch-Waxman Act of 1984 (P.L. 98-417) provides a special process to allow limited generic entry before patent expiration. This process—sometimes called Hatch-Waxman's "skinny-label" provisions—allows a generic manufacturer to seek approval from the U.S. Food and Drug Administration (FDA) only for approved uses of the drug no longer protected by patents. This In Focus provides background on the skinny-label provisions and issues for Congress relating to skinny labels.

New and Generic Drug Approval

All new drugs must be approved by FDA before they can be marketed or sold in the United States. New drugs are generally approved by FDA through a new drug application (NDA). To obtain FDA approval, NDA sponsors typically conduct clinical trials to demonstrate a drug's safety and effectiveness—a costly and time-consuming process. NDA sponsors must also submit proposed labeling for the drug for FDA's approval, including the approved indications for use of the drug (e.g., the diseases or conditions that the drug is approved to treat). Although FDA approves new drugs for specific indications, physicians may still prescribe an approved drug "off label" to treat other indications that FDA has not reviewed for safety and effectiveness.

To encourage market entry of generic drugs, Hatch-Waxman created a separate pathway for FDA approval through abbreviated new drug applications (ANDAs). ANDA filers need only show that their product is pharmaceutically equivalent and bioequivalent to an FDA-approved drug with the same active ingredient (such that the new drug can be expected to have the same therapeutic effect). As a result, generic drug manufacturers need not conduct their own clinical trials on safety and efficacy, and often sell the drug at lower prices. ANDA filers must also propose labeling for the generic drug, which generally must be the same as the referenced brand-name drug's labeling.

Pharmaceutical Patents

Patents are granted by the U.S. Patent and Trademark Office to protect new and useful inventions. Patent rights last for about 20 years. If the patent is valid, no one else may make, use, sell, or import the patented invention in the United States during that period without permission from the patent holder. Drug manufacturers may patent a drug's active ingredient, formulations, methods of use (indications), and devices to administer a drug, among other things. A single drug may be protected by multiple patents that expire at different times.

Orange Book Patents and "Use Codes"

An NDA sponsor must submit to FDA information on any patent that either (1) claims the drug (i.e., an active ingredient, formulation, or composition patent) or (2) claims a method of using the drug for which FDA approval is sought.

For method-of-use patents, FDA regulations require the NDA sponsor to include a description of the patent and information on whether the patent claims one or more FDA-approved methods of using the drug. This description must be adequate to assist future ANDA filers in determining whether the patent covers a given approved use (i.e., a drug's indication). The description provided by the NDA sponsor on method-of-use patents is known as a use code. The NDA sponsor must also identify the sections of the proposed drug label that describe the method(s) of use claimed by the patent. If the drug is approved, FDA publishes the patent information and use codes (along with any updates) in a resource known as the "Orange Book." The Orange Book lists all FDA-approved nonbiologic drugs, along with therapeutic equivalence evaluations and information on drug patents and other exclusivities. (For more information, see CRS In Focus IF12644, Patent Listing in FDA's Orange Book.)

FDA views its authority over patent information in the Orange Book as "ministerial." That is, FDA does not independently verify the accuracy of use codes and other patent information; FDA merely publishes it in the Orange Book. NDA sponsors must declare that the patent information they submit is accurate and complete.

ANDAs and Patent Certification

Paragraph I-IV Certifications

Under Hatch-Waxman, ANDA filers must usually make a certification for each patent listed in the Orange Book for the drug at issue. For example, ANDA filers may certify that there are no patents listed for the drug or that all the listed patents are expired. In that case, FDA may approve the ANDA whenever its review is complete.

ANDA filers may also make what is called a paragraph IV certification: a claim that the listed patent is either invalid, or would not be infringed (i.e., violated) by the ANDA filer making and selling the generic drug. Paragraph IV certifications often lead to patent litigation in federal court. If the NDA sponsor timely files suit following a paragraph IV certification, FDA generally cannot approve the ANDA for 30 months while the litigation proceeds (known as the "30-month stay").

Section viii Statements and "Skinny Labels"

Hatch-Waxman provides an additional patent certification option for method-of-use patents. With a section viii statement, an ANDA filer certifies that the patent does not cover the uses of the drug for which the ANDA filer seeks approval. Section viii statements are typically used when some (but not all) approved methods of using the drug are still patented. Through a section viii statement, an ANDA filer may seek FDA approval only for the approved uses of the drug that are not patented. Unlike a paragraph IV certification, a section viii statement does not delay FDA's ability to approve the ANDA (i.e., the 30-month stay does not apply). Along with a section viii statement, the ANDA filer must submit proposed labeling that omits the parts of the brand-name drug's labeling that correspond to still-patented uses identified by the NDA sponsor. For this reason, generics relying on section viii statements are said to "carve out" the patented uses. The result is a skinny label for the generic version.

Challenges to Orange Book Use Codes

The use codes and label portions identified by the NDA sponsor define what the ANDA filer must carve out when using a section viii statement. If the use codes are overly broad (i.e., they extend beyond what a patent actually claims) then an ANDA filer may be unable to use a section viii statement as a practical matter, and may choose to file a paragraph IV certification or wait to file the ANDA.

ANDA filers' ability to challenge the use codes and other patent information provided by NDA holders is limited. While FDA provides a regulatory process to dispute Orange Book patent information, FDA will not change Orange Book patents or use codes unless the NDA holder agrees to update or correct them. In the Medicare Prescription Drug, Improvement, and Modernization Act of 2003 (MPDIMA) (P.L. 108-173), Congress created a counterclaim allowing ANDA filers to seek a court order correcting or deleting Orange Book patent information. Because the counterclaim is not an independent cause of action, an ANDA filer cannot assert it unless they are sued first (e.g., after a paragraph IV certification).

In Caraco Pharmaceutical Labs. v. Novo Nordisk (U.S. 2021), the Supreme Court construed the scope of this counterclaim that MPDIMA created. The Court unanimously held that the counterclaim could be used by generics to correct inaccurate use codes (e.g., use codes that purport to cover methods not actually protected by patent). Justice Sonia Sotomayor wrote separately in Caraco to express her view that action from FDA or Congress is needed to fully "fix" the problem of overly broad use codes.

Skinny Labels and Induced Patent Infringement Liability

Because the brand-name drug is still protected by one or more patents, patients and doctors may use a skinny-label generic in an infringing manner (i.e., for still-patented uses). If a generic manufacturer takes active steps to encourage the "carved out" patented uses, they may be held liable for inducing patent infringement. Recent judicial decisions on patent infringement liability for skinny-label drugmakers have increased concerns by some stakeholders about whether the skinny-label provisions remain effective in facilitating partial generic competition.

In GlaxoSmithKline LLC v. Teva Pharmaceuticals USA (Fed. Cir. 2021), the U.S. Court of Appeals for the Federal Circuit (Federal Circuit) affirmed a jury verdict finding a generic manufacturer liable for inducement even though the manufacturer carved out the label portions identified by the brand's use codes and did not specifically tell doctors to use the generic for carved-out uses. The majority in GSK v. Teva held that a jury could reasonably find that Teva actively induced patent infringement based on the generic's label (which included an infringing indication not identified by the use code), advertising, and press releases. The Supreme Court declined to hear Teva's appeal in 2023.

In Amarin Pharma, Inc. v. Hikma Pharmaceuticals USA (Fed. Cir. 2024), the Federal Circuit reversed a lower court decision that dismissed a complaint alleging induced infringement by a generic manufacturer using a skinny label. The allegations of inducement in that case focused on the skinny label itself and press releases that promoted the skinny-label drug as a "generic equivalent" of the brand-name drug. Following a brief from the U.S. Solicitor General arguing that skinny labels themselves should not "be treated as evidence of culpable encouragement to infringe," the Supreme Court agreed to hear argument in Hikma v. Amarin during its October 2025 term.

Considerations for Congress

Should Congress seek to clarify Hatch-Waxman's skinny-label provisions, there are several possible issues it may consider. One issue concerns responsibility for monitoring and correcting Orange Book use codes and other patent information. The FDA does not independently verify use codes and generic manufacturers have limited means to challenge them, yet inaccurate use codes may interfere with generic drugmakers' ability to effectively use section viii statements. This may lead to litigation and delay in generic approval in some cases. Congress may consider whether to impose more responsibilities on FDA to monitor Orange Book patent information, or to expand current procedures for challenging that information. For example, Congress could consider creating an independent cause of action to correct Orange Book patent information (such as that proposed by S. 1128 in the 118th Congress).

Cases like Hikma v. Amarin and GSK v. Teva make clear that under current law a drug manufacturer may sometimes be liable for inducing patent infringement when marketing skinny label generics. These cases have arguably increased risk and uncertainty for generic manufacturers when using the section viii pathway. Congress may thus consider whether to clarify when generic manufacturers using a skinny label should be liable for indirect patent infringement through a statutory safe harbor (such as that proposed by S. 43 and H.R. 6485 in the 119th Congress).